0 10 20 30 40 50 60 E [keV] 0.0

0.2

0.4

0.6

0.8

1.0 fotonu [s^{-1}]

0 10 20 30 40 50 60 E [keV] 0

5

10 15 20

25 30

35

40 fotonu [s^{-1}]

2^{77}Am

Graf 1

Graf 2

2_9Cu

K_α

0 10 20 30 40 50 60 E [keV] 0.0

0.1 0.2 0.3 0.4

0.5 0.6 0.7

0.8 fotonu [s^{-1}]

0 10 20 30 40 50 60 E [keV] 0.0

0.1

0.2

0.3

0.4

0.5

0.6

0.7 fotonu [s^{-1}]

5_0Sn

4_5Rh

Graf 3

Graf 4

K_α

K_β

K_α

K_β

0 10 20 30 40 50 60 E [keV] 0.0

0.1

0.2

0.3

0.4

0.5 fotonu [s^{-1}]

0 10 20 30 40 50 60 E [keV] 0.0

0.1

0.2

0.3

0.4

0.5 fotonu [s^{-1}]

8_2Pb L_α

L_β

Graf 5

Graf 6

K_α (Ag)

K_β (Ag)

K_α (Mo)

25 30 35 40 45 50 55 Z 4

6

8

10

12 fotonu [s^{-1}]

0 10 20 30 40 50 60 E [keV] 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 fotonu [s^{-1}]

Y Title

Ag Mo

Graf 7

1^{33}Ba → ^{133}Cs

K_α

K_β

Graf 8